Ironman Aerobic Fitness Balance Board and Straps

Ironman Aerobic Fitness Balance Board and Straps

Ironman aerobic fitness balance board with straps for additional exercises is designed for the toning of the lower leg/foot muscles and to improve overall body balance.

Approx diameter 39cm

Max weight: 225lbs

The post Ironman Aerobic Fitness Balance Board and Straps appeared first on SS Healthfoods.