Novotec Deluxe Weighted Jacket 50lb (B Graded See Listing)

Please note: due to a number of complaints regarding the stitching being inadequate and too close to the edge of the material, we are selling the vests at a vastly reduced price to clear what we consider to be “B graded second” weighted vest on a non-refundable basis. We do advise applying some additional stitching in and around the edges where stress points are, also around the weighted pockets at the stress sections before use.
Ironman 50 lbs Weighted Vest with superior form, fit and function distributes Weight Evenly around Torso to Help Improve Cardiovascular Conditioning and Strength during a Workout. Removable weighted Packs for Adjustment. Durable Breathable Mesh with Four Adjustable Front Clip Belts Reinforced Shoulder Padding and Adjustable Straps for a More Comfortable Fit. One Size Fits Most but if you are overweight the straps may not fasten. Add resistance to aerobics, running, jumping rope or any other exercise. With weight concentrated on your upper body, your abdominal muscles will burn calories on overtime.

Included 24 weights. 12 weights on the front and 12 on the back

The post Novotec Deluxe Weighted Jacket 50lb (B Graded See Listing) appeared first on SS Healthfoods.