Ironman Anti Burst Gym Ball-55cm

Ironman Anti Burst Gym Ball -55cm (with Exercise Instructions)

This Ironman Gym Ball is ideal for training, toning and strengthening your core muscles. Level up your workout by adding free weights to train other areas of your body, such as your shoulders, arms and chest. This gym ball is great for improving your balance and co-ordination.

55cm diameter ball.

Works full body muscles & helps with balance and co-ordination.

A great exercise alternative for any age and fitness level.

Washable and easy to care for.

Anti burst gym ball has a maximum user weight 125kg (19st 10lb).

Includes pump for easy inflation

Can be deflated for storage

Colour Blue

The post Ironman Anti Burst Gym Ball-55cm appeared first on SS Healthfoods.