Ironman Aerobic Fitness Exercise Mat Ribbed

Blue ribbed Exercise Mat

Ideal for Pilates, general exercise or yoga

Easy to roll

Carry handle and elasticated straps to secure

Dimensions 1680 mm by 610 mm. Thickness approximately 5mm

Made of a soft padded felt like material with an dark anti-slip base layer

Can be rolled up and has elasticated straps to secure

Also has a strap to carry it with!

The post Ironman Aerobic Fitness Exercise Mat Ribbed appeared first on SS Healthfoods.